&lt;div dir="ltr"&gt;Prezados, boa noite. &lt;div&gt;O scanner do Cartório apresentou um erro de "substituição de peça", segue em anexo o erro. &lt;/div&gt;&lt;div&gt;&lt;br style="clear: both;" /&gt;&lt;div&gt;&lt;br /&gt;&lt;/div&gt;&lt;span class="gmail_signature_prefix"&gt;-- &lt;/span&gt;&lt;br /&gt;&lt;div dir="ltr" class="gmail_signature" data-smartmail="gmail_signature"&gt;&lt;div dir="ltr"&gt;&lt;div&gt;Atenciosamente,&lt;/div&gt;&lt;div&gt;&lt;u&gt;Ana Amélia Rubio Cruz&lt;/u&gt;&lt;/div&gt;&lt;b&gt;Cartório/ NPJ &lt;/b&gt;&lt;div&gt;&lt;img src="https://drive.google.com/uc?id=1CfFm4HaBqpiOjHM1xMDW6cO5asIVrzll&amp;export=download" alt="image" /&gt;&lt;br /&gt;&lt;/div&gt;&lt;/div&gt;&lt;/div&gt;&lt;/div&gt;&lt;/div&gt;